Spis treœci
Diagnoskop 1.69

(correct version of on-line help will be soon available)

Index:

Program Windows


Przegl¹d okien programu
Program Windows

(correct version of on-line help will be soon available)

Basic operations

Work mode

Saving the data

Loading the data

Cursors

Zooming

Printing

Firm Information

Working with configurations

Loading the configuration

Saving the configuration

New directory

Measurement description

Taking the measurements

Time base

New measurements

Delay

Settings

Program settings

Channels' settings (oscilloscope)

Channels' settings (recorder & diagnoscope)

Calibration before taking the measurements

Advanced

Configuration Manager

Rename window

Base configuration directory

Selection of configuration directory

Configuration import options

Import directory confirmation


Okno trybu pracy
Work mode

(correct version of on-line help will be soon available)

Changing the work mode

See also:

Program Windows


Okno zapisu danych
Saving the data

(correct version of on-line help will be soon available)

Saving the data

See also:

Program Windows


Okno odczytu danych
Loading the data

(correct version of on-line help will be soon available)

Loading the data

See also:

Program Windows


Okno kursorów
Cursors

(correct version of on-line help will be soon available)

Time period cursors and value cursor

See also:

Program Windows


Okno wyboru powiêkszenia
Zooming

(correct version of on-line help will be soon available)

Zoom selection

See also:

Program Windows


Okno drukowania
Printing

(correct version of on-line help will be soon available)

Printing

See also:

Program Windows


Okno informacji o firmie
Firm Information

(correct version of on-line help will be soon available)

Firm Information

See also:

Program Windows


Okno odczytu konfiguracji
Loading the configuration

(correct version of on-line help will be soon available)

Loading the configuration

See also:

Program Windows


Okno zapisu konfiguracji
Saving the configuration

(correct version of on-line help will be soon available)

Saving the configuration

See also:

Program Windows


Tworzenie nowego katalogu
New directory

(correct version of on-line help will be soon available)

New directory

See also:

Program Windows


Okno opisu wykonywania pomiarów
Measurement description

(correct version of on-line help will be soon available)

Measurement description

See also:

Program Windows


Okno podstawy czasu (oscyloskop)
Time base (oscilloscope)

(correct version of on-line help will be soon available)

Time base

See also:

Program Windows


Okno nowych pomiarów (rejestrator)
New measurements (recorder)

(correct version of on-line help will be soon available)

New measurements

See also:

Program Windows


Okno opóŸnienia (diagnoskop)
Delay (diagnoscope)

(correct version of on-line help will be soon available)

Delay

See also:

Program Windows


Okno ustawieñ programu
Program settings

(correct version of on-line help will be soon available)

Device detection, base configuration directory

See also:

Program Windows


Okno ustawieñ kana³ów (oscyloskop)
Channels' settings (oscilloscope)

(correct version of on-line help will be soon available)

A + B + synchronization

See also:

Program Windows


Okno ustawieñ kana³ów (rejestrator i diagnoskop)
Channels' settings (recorder & diagnoscope)

(correct version of on-line help will be soon available)

A + B + C + D

See also:

Program Windows


Okno kalibracji
Calibration window

(correct version of on-line help will be soon available)

Calibration before taking the measurements

See also:

Oscilloscope calibration

Program Windows


Okno Mened¿era konfiguracji
Configuration Manager

(correct version of on-line help will be soon available)

Configuration Manager

See also:

Program Windows


Okno zmiany nazwy (konfiguracji lub katalogu)
Rename window

(correct version of on-line help will be soon available)

Renaming the configuration or directory

See also:

Program Windows


Okno katalogu konfiguracji
Base configuration directory

(correct version of on-line help will be soon available)

Base configuration directory

See also:

Program Windows


Okno wyboru katalogu konfiguracji
Selection of configuration directory

(correct version of on-line help will be soon available)

Selection of configuration directory

See also:

Program Windows


Okno opcji importu konfiguracji
Configuration import options

(correct version of on-line help will be soon available)

Configuration import options

See also:

Program Windows


Okno potwierdzenia importu katalogu
Import directory confirmation

(correct version of on-line help will be soon available)

Import directory confirmation

See also:

Program Windows


Kalibracja oscyloskopu
Oscilloscope calibration

(correct version of on-line help will be soon available)

Oscilloscope calibration

See also:

Calibration before taking the measurements